; UVFXT
;---------------------------------------------------------------
;! modifies UV data (adjusting by a small time)
;# Task UV fix times
;-----------------------------------------------------------------------
;---------------------------------------------------------------
UVFXT     LLLLLLLLLLLLUUUUUUUUUUUU CCCCCCCCCCCCCCCCCCCCCCCCCCCCC
UVFXT     Fix time and uvw coordinates for UV data
INNAME                             Input UV file name (name)
INCLASS                            Input UV file name (class)
INSEQ             0.0     9999.0   Input UV file name (seq. #)
INDISK            0.0        9.0   Input UV file disk unit #
IN2NAME                            Aux. file name.
IN2CLASS                           Aux. file class.
IN2SEQ            0.0     9999.0   Aux. file seq. #
IN2DISK           0.0        9.0   Aux file volumn number
OUTNAME                            Output UV file name (name)
OUTCLASS                           Output UV file name (class)
OUTSEQ           -1.0     9999.0   Output UV file name (seq. #)
OUTDISK           0.0        9.0   Output UV file disk unit #.
APARM                              User supplied array
                                   APARM(1) time to add (s)
                                   APARM(2) number of uvw points
                                      to print for diagnostics
BPARM                              User array (not used)
BOX                                User array (not used)
----------------------------------------------------------------
UVFXT
Task:  This task reads uv data, adds a specified time, and adjusts
       the u,v,w coordinates accordingly.

       This corrects u,v,w for small time offsets.

Adverbs:
  INNAME.....Input UV file name (name).      Standard defaults.
  INCLASS....Input UV file name (class).     Standard defaults.
  INSEQ......Input UV file name (seq. #).    0 => highest.
  INDISK.....Disk drive # of input UV file.  0 => any.
  IN2NAME....Aux. file name. Can be used for any purpose.
  IN2CLASS...Aux. file class
  IN2SEQ.....Aux. file sequence number.
  IN2DISK....Aux. file sequence number.
  OUTNAME....Output UV file name (name).     Standard defaults.
  OUTCLASS...Output UV file name (class).    Standard defaults.
  OUTSEQ.....Output UV file name (seq. #).   0 => highest unique
  OUTDISK....Disk drive # of output UV file. 0 => highest with
             space for the file.
  APARM......User specified array
               APARM(1) is time shift factor (s)
               APARM(2) is the numnber of uvw point to list
               (for diagnostics)
  BPARM......User specified array (not used)
  BOX........User specified array (not used)
----------------------------------------------------------------
